version of June 2, 2007, Frank Sergeant, frank@pygmy.utoh.org

Olimex LPC-P2378 Board Connectors UEXT

1

3.3V

3

TXD2

5

SCL0

7

MISO

9

SCK

2

 GND

4

 RXD2

6

 SDA0

8

 MOSI

10

 SSEL